0 5 10 15 20 25 30 35 40

0 5000 10000 15000 20000 25000 30000

time of arrival of photons on detector

ID Entries Mean RMS

10 135 6081. 4242.

Wavelength of photons lost by photocathode

ID Entries Mean RMS

34 347 401.4 25.32

0 10 20 30 40 50

300 350 400 450 500 550 600 650 700 750 800