F.-P.Schilling BDC Status

BDC Status

• BDC had been seriously damaged during spring shutdown as the north-hall-staff was pulling it out of the cryostat → several large gas leaks at inner radius!

• Recovery after subsequent repair went very smoothly!

(air-tightness better than before the accident!)

• - in August, one half-sector had to be disconnected - now 4 half-sectors out of 128 dead - still at least 7 out of 8 layers active everywhere in θ, ϕ!

F.-P.Schilling BDC Status

BDC Efficiency

• Total BDC Efficiency is 98% !

Summary: BDC is running smoothly and efficiently!